ALTER TABLE `mallink`.`wx_weapp_code_status` 
ADD COLUMN `plat` smallint(2) NOT NULL DEFAULT 1 COMMENT '平台' AFTER `type`;


ALTER TABLE `mallink`.`wx_weapp_audit_status`
ADD COLUMN `plat` smallint(2) NOT NULL DEFAULT 1 COMMENT '平台' AFTER `type`;


ALTER TABLE `mallink`.`wx_weapp_release_status`
ADD COLUMN `plat` smallint(2) NOT NULL DEFAULT 1 COMMENT '平台' AFTER `type`;