ALTER TABLE wx_finance_finish DROP COLUMN NAME;


CREATE TABLE `wx_finance_finish_receive` (
  `id` bigint(20) NOT NULL COMMENT '主键ID',
  `tenant_id` varchar(5) COLLATE utf8mb4_unicode_ci NOT NULL COMMENT '租户ID',
  `parent_tenant_id` varchar(5) COLLATE utf8mb4_unicode_ci DEFAULT NULL COMMENT '父租户ID',
  `create_time` timestamp NULL DEFAULT NULL,
  `update_time` timestamp NULL DEFAULT NULL,
  `status` int(3) NOT NULL COMMENT '状态',
  `finish_id` bigint(20) NOT NULL COMMENT '交款ID',
  `receive_id` bigint(20) NOT NULL COMMENT '收付款单号',
  PRIMARY KEY (`id`),
  UNIQUE KEY `id_UNIQUE` (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci ROW_FORMAT=DYNAMIC COMMENT='能耗表';


wx_finance_finish back_remark 改成 audit_remark

